;
;         File: wshtcpip.def
;       System: MS-Windows 3.x
;      Summary: Module definition file for TCP/IP helper DLL for WinSockAPI DLL.
;

LIBRARY         WSHTCPIP        ; Application's module name

DESCRIPTION     'TCP/IP Windows Sockets Helper DLL'

;CODE can be FIXED in memory because of potential upcalls
CODE            PRELOAD         FIXED

;DATA must be SINGLE and at a FIXED location since this is a DLL
DATA            PRELOAD         FIXED           SINGLE

HEAPSIZE        1024
STACKSIZE       16384

; All functions that will be called by any Windows routine
; must be exported

EXPORTS
        WSHGetSockaddrType
        WSHGetWildcardSockaddr
        WSHGetSocketInformation
        WSHGetWinsockMapping
        WSHNotify
        WSHOpenSocket
        WSHSetSocketInformation
        WSHEnumProtocols
        WSHOpenSocket2
        WSHJoinLeaf
        WSHGetWSAProtocolInfo
        WSHGetBroadcastSockaddr
        WSHAddressToString
        WSHStringToAddress
        WSHGetProviderGuid
        WSHIoctl

;eof

