LIBRARY         WSHISN

DESCRIPTION     'ISN Windows NT Sockets Helper DLL'

CODE    PRELOAD FIXED
DATA    PRELOAD FIXED   SINGLE

HEAPSIZE        1024
STACKSIZE       16384

EXPORTS
        WSHGetSockaddrType
        WSHGetSocketInformation
        WSHGetWinsockMapping
        WSHNotify
        WSHOpenSocket
        WSHSetSocketInformation
        WSHGetWildcardSockaddr
        WSHEnumProtocols
        WSHGetProviderGuid

