LIBRARY 		HPFLSH16
DESCRIPTION  	'Hewlett-Packard 16 Mass Storage UI Applet DLL'

CODE         	LOADONCALL MOVEABLE DISCARDABLE
DATA         	PRELOAD FIXED SINGLE

HEAPSIZE     	1024

SEGMENTS
				_TEXT	PRELOAD MOVEABLE DISCARDABLE

EXPORTS
;;				WEP @1 RESIDENTNAME ;; required WEP entry point (uses library WEP routine)

