<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">LIBRARY 			HPHCO
DESCRIPTION  	'Hewlett-Packard High Capacity Output Applet DLL'

CODE         	LOADONCALL MOVEABLE DISCARDABLE
DATA         	PRELOAD MOVEABLE SINGLE

HEAPSIZE     	1024

EXPORTS
;;					WEP @1 RESIDENTNAME ;; required WEP entry point (uses library WEP routine)

</pre></body></html>