;--------------------------------------------------------------------
;
; when modifying this file please be aware that the common portions
; are stored in ..\kdextdef.src.  Put your extension in the correct
; alphabetical order.  all extension names must be in lower case!
;
;--------------------------------------------------------------------

;--------------------------------------------------------------------
;
; these are the i386 specific exports
;
;--------------------------------------------------------------------

    apic
    ioapic
    mca
    mtrr
    kb
    kv
    npx
    pcr
    sel
    tss

LIBRARY KDEXTX86

DESCRIPTION 'Kernel Debugger Extensions Api Library - x86'
