NAME	     UPE

DESCRIPTION  'User Profile Editor'

EXETYPE      WINDOWS

STUB	     'WINSTUB.EXE'

CODE  PRELOAD MOVEABLE DISCARDABLE

DATA  PRELOAD MOVEABLE


HEAPSIZE     1024
STACKSIZE    5120	   ; recommended minimum for Windows applications


; All functions that will be called by any Windows routine
; MUST be exported.

EXPORTS
	MainWndProc   @1
	UPEDlgProc    @2
        MessageFilter @3
