LIBRARY 		HPSNMP16	
DESCRIPTION  	'Hewlett-Packard 16 bit SNMP Language Applet DLL'

CODE         	LOADONCALL MOVEABLE DISCARDABLE
DATA         	PRELOAD MOVEABLE SINGLE

HEAPSIZE     	1024

SEGMENTS
				_TEXT	PRELOAD MOVEABLE DISCARDABLE

EXPORTS
				WEP @1 RESIDENTNAME ;; required WEP entry point (uses library WEP routine)

