<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">LIBRARY			HPELKUI
DESCRIPTION		'Hewlett-Packard Printer Applet UI (5) DLL'

CODE			LOADONCALL MOVEABLE DISCARDABLE
DATA			PRELOAD MOVEABLE SINGLE

HEAPSIZE		1024

EXPORTS
;;				WEP @1 RESIDENTNAME ;; required WEP entry point (uses library WEP routine)

</pre></body></html>