LIBRARY			HPELKUI6
DESCRIPTION		'Hewlett-Packard 16 Bit Printer Applet DLL'

CODE			LOADONCALL MOVEABLE DISCARDABLE
DATA			PRELOAD MOVEABLE SINGLE

HEAPSIZE		1024

SEGMENTS
				_TEXT	PRELOAD MOVEABLE DISCARDABLE

EXPORTS
;;				WEP @1 RESIDENTNAME ;; required WEP entry point (uses library WEP routine)

