LIBRARY			HPECLUI
DESCRIPTION		'Hewlett-Packard Printer Applet UI (5Si) DLL'

CODE			LOADONCALL MOVEABLE DISCARDABLE
DATA			PRELOAD MOVEABLE SINGLE

HEAPSIZE		1024

EXPORTS
;;				WEP @1 RESIDENTNAME ;; required WEP entry point (uses library WEP routine)

