;--------------------------------------------------------------------
;
; when modifying this file please be aware that the common portions
; are stored in ..\kdextdef.src.  Put your extension in the correct
; alphabetical order.  all extension names must be in lower case!
;
;--------------------------------------------------------------------


;--------------------------------------------------------------------
;
; these are the mips specific exports (there are none right now)
;
;--------------------------------------------------------------------


LIBRARY KDEXTMIP

DESCRIPTION 'Kernel Debugger Extensions Api Library - Mips'
