LIBRARY pdh

DESCRIPTION 'Performance Data Helper Function library'

EXPORTS
        DLLInit
		PdhGetDllVersion
        PdhOpenQuery
        PdhAddCounterA
        PdhAddCounterW
        PdhRemoveCounter
        PdhCollectQueryData
        PdhCloseQuery
        PdhGetFormattedCounterValue
        PdhGetRawCounterValue
        PdhCalculateCounterFromRawValue
        PdhComputeCounterStatistics
        PdhGetCounterInfoA
        PdhGetCounterInfoW
        PdhSetCounterScaleFactor
        PdhConnectMachineA
        PdhConnectMachineW
        PdhEnumMachinesA
        PdhEnumMachinesW
        PdhEnumObjectsA
        PdhEnumObjectsW
        PdhEnumObjectItemsA
        PdhEnumObjectItemsW
        PdhMakeCounterPathA
        PdhMakeCounterPathW
        PdhParseCounterPathA
        PdhParseCounterPathW
        PdhParseInstanceNameA
        PdhParseInstanceNameW
        PdhValidatePathA
        PdhValidatePathW
        PdhGetDefaultPerfObjectA
        PdhGetDefaultPerfObjectW
        PdhGetDefaultPerfCounterA
        PdhGetDefaultPerfCounterW
        PdhBrowseCountersA
        PdhBrowseCountersW
        PdhExpandCounterPathA
        PdhExpandCounterPathW
;
;       functions exported for Visual Basic only
;
        PdhVbOpenQuery
        PdhVbAddCounter
        PdhVbGetDoubleCounterValue
        PdhVbGetOneCounterPath
        PdhVbCreateCounterPathList
        PdhVbGetCounterPathFromList
        PdhVbGetCounterPathElements
        PdhVbIsGoodStatus
