LIBRARY         MSGINA

DESCRIPTION     'Windows NT Logon GUI'

EXPORTS
        WlxNegotiate
        WlxInitialize
        WlxDisplaySASNotice
        WlxLoggedOutSAS
        WlxActivateUserShell
        WlxLoggedOnSAS
        WlxDisplayLockedNotice
        WlxWkstaLockedSAS
        WlxIsLockOk
        WlxIsLogoffOk
        WlxLogoff
        WlxShutdown
        WlxStartApplication
        WlxScreenSaverNotify
