;  File: D:\WACKER\comstd\comstd.def (Created: 08-Dec-1993)
;
;  Copyright 1994 by Hilgraeve Inc. -- Monroe, MI
;  All rights reserved
;
;  $Revision: 1.3 $
;  $Date: 1994/02/24 12:25:43 $
;

LIBRARY   COMSTD

CODE	  PRELOAD MOVEABLE DISCARDABLE
DATA	  MULTIPLE

EXPORTS
	; comstd.c
	ComStdEntry@12

	DeviceGetInfo@12
	DeviceInitialize@12
	DeviceFindPorts@4
	DeviceClose@4
	DeviceDialog@8
	DeviceGetCommon@8
	DeviceSetCommon@8
	DeviceCheckSysFile@4
	DeviceClearSysFile@4
	DeviceReadSysFile@8
	DeviceUpdateSysFile@8
	DeviceSpecial@16

	PortConfigure@4
	PortActivate@8
	PortDeactivate@4
	PortConnected@4

	RcvRefill@4
	RcvClear@4

	SndBufrSend@12
	SndBufrIsBusy@4
	SndBufrQuery@12
	SndBufrClear@4
