NAME            TABTEST
DESCRIPTION     'Shell Control test'
CODE            PRELOAD MOVEABLE DISCARDABLE
DATA            PRELOAD MOVEABLE MULTIPLE

HEAPSIZE        256
STACKSIZE       8192

