; module-definition file for generic

NAME		  GENERIC	   ; application's module name

DESCRIPTION  'Sample Microsoft Windows Application'

EXETYPE       WINDOWS       ; required for all Windows applications

PROTMODE

;CODE can be moved in memory and discarded/reloaded
CODE  PRELOAD MOVEABLE DISCARDABLE

;DATA must be MULTIPLE if program can be invoked more than once
DATA  PRELOAD MOVEABLE MULTIPLE

HEAPSIZE     1024
STACKSIZE    5120           ; recommended minimum for Windows applications

; All functions that will be called by any Windows routine
; MUST be exported.

EXPORTS
    ScreenSaverProc
    ScreenSaverConfigureDialog
