;--------------------------------------------------------------------
;
; when modifying this file please be aware that the exports are
; organized so that maintanence is as easy as possible.  put your
; extension in the correct section and in alphabetical order.  also,
; remember to update the other def files in the parallell directories
; to contain your new extension.  all extension names must be in
; lower case!
;
;--------------------------------------------------------------------


EXPORTS

;--------------------------------------------------------------------
;
; these are the USBPORT extensions...
;
;--------------------------------------------------------------------
	_bw
    _cfgh
    _cmbf
	_devh
	_descusb
	_desccfg
	_ehcidd		
	_ehciep	
	_ehciframe
	_ehciqh
	_ehciregs
	_ehcisitd
	_ehcistq
	_ehcitd
	_ehciitd
    _ehcitfer
	_endp
	_enumlog
	_eplog
    _ext
    _help
    _iso
    _isolog
    _ifh
    _list
    _log
    _mdl
    _ohcidd
    _ohcied
    _ohciep
    _ohciregs
    _ohcitd
    _ohcitfer
    _piph
    _pow
    _spin
    _tfer
    _tt
    _uhcidd
    _uhciports
    _uhcifl
    _uhcitd
    _uhciqh
    _urb
    _usbirps
    _usbport
    _xlog

;--------------------------------------------------------------------
;
; these are the extension service functions provided for the debugger
;
;--------------------------------------------------------------------

     DebugExtensionNotify
     DebugExtensionInitialize
     DebugExtensionUninitialize
