; rwinf.def : Declares the module parameters for the DLL.

LIBRARY      RWINF
EXPORTS
	RWGetTypeString		@2
	RWValidateFileType	@3
	RWReadTypeInfo		@4
	RWGetImage			@5
	RWWriteFile			@6
	RWParseImage		@7
	RWUpdateImage		@8
