<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">; Module-Definition file for GENERIC -- used by LINK.EXE
; ==========================================================================
; This isn't really needed for an Application, but it's handy to use for
; setting the 'Description' text
NAME         Generic       ; application's module name
DESCRIPTION  'Sample Microsoft Windows Application'
</pre></body></html>