
;--------------------------------------------------------------------
;
; when modifying this file please be aware that the exports are
; organized so that maintanence is as easy as possible.  put your
; extension in the correct section and in alphabetical order.  also,
; remember to update the other def files in the parallell directories
; to contain your new extension.  all extension names must be in
; lower case!
;
;--------------------------------------------------------------------
NAME NTFSKD.DLL

EXPORTS

;--------------------------------------------------------------------
;
; These are the scsiport specific debugger extensions
;
;--------------------------------------------------------------------

    fo
    d
    db
    fshelp
    
    lcb
    pcb
    udfmcb
    udfvdo
    udficbsc

    udftag
    ud

    tree

	cdrawdirent
	cdvdo
	
	fatvdo
	
    countclearbits
    countdwords

    vmcb

;--------------------------------------------------------------------
;
; these are the extension service functions provided for the debugger
;
;--------------------------------------------------------------------

    CheckVersion
    WinDbgExtensionDllInit
    ExtensionApiVersion

