;--------------------------------------------------------------------
;
; when modifying this file please be aware that the exports are
; organized so that maintanence is as easy as possible.  put your
; extension in the correct section and in alphabetical order.  also,
; remember to update the other def files in the parallell directories
; to contain your new extension.  all extension names must be in
; lower case!
;
;--------------------------------------------------------------------


EXPORTS
    handle
    vprot

;--------------------------------------------------------------------
;
; these are the common exports that all dlls contain
;
;--------------------------------------------------------------------


;--------------------------------------------------------------------
;
; these are the extension service functions provided for the debugger
;
;--------------------------------------------------------------------

    DebugExtensionNotify
    DebugExtensionInitialize
    DebugExtensionUninitialize
