LIBRARY         msidle
; DESCRIPTION is obsolete and gives the IA64 linker the heebie-jeebies
;DESCRIPTION     'User idle detection DLL'

SECTIONS
#ifdef MSIDLE_DOWNLEVEL
    .shrdata READ WRITE SHARED
#endif

EXPORTS
    LibMain
    BeginIdleDetection      @3 NONAME
    EndIdleDetection        @4 NONAME
    SetIdleTimeout          @5 NONAME
    SetIdleNotify           @6 NONAME
    SetBusyNotify           @7 NONAME
    GetIdleMinutes          @8 NONAME
