NAME	     DdeSpy

EXETYPE      WINDOWS	   ; required for all Windows applications

STUB	     'WINSTUB.EXE' ; Generates error message if application
			   ; is run without Windows

;CODE can be moved in memory and discarded/reloaded
CODE  PRELOAD MOVEABLE DISCARDABLE

;DATA must be MULTIPLE if program can be invoked more than once
DATA  PRELOAD MOVEABLE MULTIPLE


HEAPSIZE     4096
STACKSIZE    5120	   ; recommended minimum for Windows applications


; All functions that will be called by any Windows routine
; MUST be exported.

EXPORTS
	MainWndProc   @1   ; name of window processing function
	About	      @2   ; name of "About" processing function
        OpenDlg       @3
        StrWndProc    @4
        DdeCallback   @5
        MarkDlgProc   @6
        MCLBClientWndProc @7
        FilterDlgProc @8
