; RACPLSettings.def : Declares the module parameters for the DLL.

LIBRARY      "RACPLSettings"
;DESCRIPTION  'RACPLSettings Windows Dynamic Link Library'

EXPORTS
	OpenRACPLSettings
	CloseRACPLSettings
	GetRACPLSettings
	SetRACPLSettings